SG Software

Windows Utilities - SG Movie

The SG Movie icon can only be used to change the setup parameters for the SG Movie screen saver.  To run the screen saver, you must make the SG Movie selection from the Control Panel - Desktop program under screen savers.  Set up is also available from the Control Panel.

A copy of SG Movie was placed in your Windows directory during installation so that the Control Panel could access it.

SG Movie displays bitmaps stored in a directory.  By default, the directory used is the Windows directory.  This can be changed in the SG Movie set up.

The bitmaps can be 'floated' across the screen or centered.  The bitmaps are displayed for a period of time specified in the setup screen.  If the bitmaps have motion, this time is the time between each movement  (when the bitmap moves off the screen, the next bitmap will be displayed).  If the bitmaps are centered, this is the time between display of each new bitmap.  This time is specified in milliseconds (1000 = 1 second).